%
% AO.tex
%
% History of LulzBot Printers
%
% Copyright (C) 2014, 2015 Aleph Objects, Inc.
%
% This document is licensed under the Creative Commons Attribution 4.0
% International Public License (CC BY-SA 4.0) by Aleph Objects, Inc.
%

%\begin{figure}[h!]
%\includegraphics[keepaspectratio=true,height=0.40\textheight,width=1.00\textwidth,angle=0]{ao/ao-display.jpg}
% \caption{LulzBot AOs.}
% \label{fig:ao-display}
%\end{figure}

The LulzBot AO-100 and AO-101s were based on the MendelMax design. The AOs
printed more AOs and they printed the LulzBot TAZ. Approximately
750 AOs were built. The AO-100 production started in the first
quarter of 2012.

\input{AO-100}
\input{AO-101}

